-- Enemy→hero damage: full scale (not hero 0.35) and tighter roll band 0.8–1.0.
UPDATE runtime_config
SET
    payload = payload || '{
        "enemyCombatDamageScale": 1.0,
        "enemyCombatDamageRollMin": 0.8,
        "enemyCombatDamageRollMax": 1.0
    }'::jsonb,
    updated_at = now()
WHERE id = TRUE;
